\begin{thebibliography}{xx}

\harvarditem[Altman \& {De Stavola}]{Altman \& {De Stavola}}{1994}{alt94pra}
Altman, D.~G. \& {De Stavola}, B.~L.  (1994), ``Practical problems in fitting a
  proportional hazards model to data with updated measurements of the
  covariates'', {\em Statistics in Medicine} {\bf 13},~301--341.

\harvarditem[Andersen \& Gill]{Andersen \& Gill}{1982}{and82cox}
Andersen, P.~K. \& Gill, R.~D.  (1982), ``Cox's regression model for counting
  processes: {A} large sample study'', {\em Annals of Statistics} {\bf
  10},~1100--1120.

\harvarditem[Bailey et al.]{Bailey, Homer \& Summe}{1977}{bai77pro}
Bailey, R.~C., Homer, L.~D. \& Summe, J.~P.  (1977), ``A proposal for the
  analysis of kidney graft survival'', {\em Transplantation} {\bf
  24},~309--315.

\harvarditem[Becker et al.]{Becker, Chambers \& Wilks}{1988}{Sblue}
Becker, R.~A., Chambers, J.~M. \& Wilks, A.~R.  (1988), {\em The New S
  Language}, Wadsworth and Brooks/Cole, Pacific Grove CA.

\harvarditem[Breiman et al.]{Breiman, Friedman, Olshen \&
  Stone}{1984}{bre84cla}
Breiman, L., Friedman, J.~H., Olshen, R.~A. \& Stone, C.~J.  (1984), {\em
  Classification and Regression Trees}, Wadsworth and Brooks/Cole, Pacific
  Grove, CA.

\harvarditem[Chambers \& Hastie]{Chambers \& Hastie}{1992}{Swhite}
Chambers, J.~M. \& Hastie, T.~J., eds  (1992), {\em Statistical Models in S},
  Wadsworth and Brooks/Cole, Pacific Grove CA.

\harvarditem[Clayton]{Clayton}{1988}{cla88rev}
Clayton, D.  (1988), ``Review of {SURVCALC}'', {\em Applied Statistics} {\bf
  37},~455--456.

\harvarditem[Collett]{Collett}{1994}{col94}
Collett, D.  (1994), {\em Modelling Survival Data in Medical Research}, Chapman
  and Hall, London.

\harvarditem[Cox]{Cox}{1972}{cox72}
Cox, D.~R.  (1972), ``Regression models and life-tables (with discussion)'',
  {\em Journal of the Royal Statistical Society B} {\bf 34},~187--220.

\harvarditem[Dain et al.]{Dain, Freeman \& Vredenburgh}{1989}{dai89com}
Dain, B.~J., Freeman, D.~H. \& Vredenburgh, J.~J.  (1989), Comparison of
  different packages' survival test results, {\em in} ``Proceedings of the
  Statistical Computing Section ASA'', pp.~315--318.

\harvarditem[Fleming et al.]{Fleming, Augustine, Elcombe \&
  Offord}{1986}{fle86sur}
Fleming, T.~R., Augustine, G.~A., Elcombe, S.~A. \& Offord, K.~P.  (1986), The
  {SURVDIFF} procedure, {\em in} ``{SUGI} Supplemental Library User's Guide,
  Version 5 Edition'', SAS Institute, Inc., Cary NC, pp.~535--553.

\harvarditem[Follman \& Goldberg]{Follman \& Goldberg}{1988}{fol88dis}
Follman, D.~A. \& Goldberg, M.~S.  (1988), ``Distinguishing heterogeneity from
  decreasing hazard rates'', {\em Technometrics} {\bf 30},~389--396.

\harvarditem[Goldstein]{Goldstein}{1991}{gol91sta}
Goldstein, R.  (1991), ``Statistical {C}omputing editor's notes'', {\em
  American Statistician} {\bf 45},~304--305.

\harvarditem[Goldstein]{Goldstein}{1992}{gol92res}
Goldstein, R.  (1992), ``Restricted cubic spline functions'', {\em Stata
  Technical Bulletin} {\bf {STB-10}},~29--32.

\harvarditem[Goldstein et al.]{Goldstein, Anderson, Ash, Craig, Harrington \&
  Pagano}{1989}{gol89sur}
Goldstein, R., Anderson, J., Ash, A., Craig, B., Harrington, D. \& Pagano, M.
  (1989), ``Survival analysis software on {MS/PC--DOS} computers'', {\em
  Journal of Applied Econometrics} {\bf 4},~393--414.

\harvarditem[Grambsch \& Therneau]{Grambsch \& Therneau}{1994}{gra94pro}
Grambsch, P. \& Therneau, T.  (1994), ``Proportional hazards tests and
  diagnostics based on weighted residuals'', {\em Biometrika} {\bf
  81},~515--526.
\newblock Amendment and corrections in {\bf 82}, 668 (1995).

\harvarditem[Greene]{Greene}{1997}{gre97eco}
Greene, W.~H.  (1997), {\em Econometric Analysis}, third edn, Prentice Hall,
  New York.

\harvarditem[Hallahan]{Hallahan}{1992}{hal92dbm}
Hallahan, C.  (1992), ``{DBMS/COPY} and {DBMS/COPY Plus} ({V}ersion 2.0)'',
  {\em American Statistician} {\bf 46},~49--52.

\harvarditem[Han \& Hausman]{Han \& Hausman}{1988}{han88sem}
Han, A. \& Hausman, J.  (1988), Semiparametric estimation of duration and
  competing risk models, MIT photocopy.

\harvarditem[Harrell]{Harrell}{1983}{har83dat}
Harrell, F.~E.  (1983), Data analysis considerations and survival analysis
  programs, {\em in} J.~E. Gentle, ed., ``Computer Science and Statistics: The
  Interface'', North-Holland, Amsterdam, pp.~93--96.

\harvarditem[Harrell]{Harrell}{1986}{har86phg}
Harrell, F.~E.  (1986), The {PHGLM Procedure}, {\em in} ``SUGI Supplemental
  Library Users Guide'', {V}ersion 5 edn, SAS Institute, Inc., pp.~437--466.

\harvarditem[Harrell]{Harrell}{1996}{Design}
Harrell, F.~E.  (1996), ``{\tt Design}: {S--Plus} functions for
  biostatistical/epidemiologic modeling, testing, estimation, validation,
  graphics, prediction, and typesetting by storing enhanced model design
  attributes in the fit. {UNIX} and {Microsoft} {Windows} versions available
  from {\tt http://lib.stat.cmu.edu}.''.

\harvarditem[Harrell et al.]{Harrell, Lee \& Mark}{1996}{har96mul}
Harrell, F.~E., Lee, K.~L. \& Mark, D.~B.  (1996), ``Multivariable prognostic
  models: {Issues} in developing models, evaluating assumptions and adequacy,
  and measuring and reducing errors'', {\em Statistics in Medicine} {\bf
  15},~361--387.

\harvarditem[Harrell et al.]{Harrell, Lee \& Pollock}{1988}{har88}
Harrell, F.~E., Lee, K.~L. \& Pollock, B.~G.  (1988), ``Regression models in
  clinical studies: {D}etermining relationships between predictors and
  response'', {\em Journal of the National Cancer Institute} {\bf
  80},~1198--1202.

\harvarditem[Harrell et al.]{Harrell, Pollock \& Lee}{1987}{har87}
Harrell, F.~E., Pollock, B.~G. \& Lee, K.~L.  (1987), Graphical methods for the
  analysis of survival data, {\em in} ``Proceedings of the Twelfth Annual SAS
  Users Group International Conference'', SAS Institute, Inc., Cary, NC,
  pp.~1107--1115.

\harvarditem[Hoffman]{Hoffman}{1985}{hof85sim}
Hoffman, R.~G.  (1985), Simulated temporal models for proportional hazards
  models with time varying covariates, {\em in} ``Proceedings of the
  Statistical Computing Section ASA'', pp.~390--395.

\harvarditem[Hudec et al.]{Hudec, Hitz \& Muellner}{1985}{hud85sof}
Hudec, M., Hitz, M. \& Muellner, W.  (1985), Software for survival analysis.
  {A} comparative survey ({German}), {\em in} ``Proceedings of the
  Statistik-Software Third Conference on the Scientific Use of Statistical
  Software'', Gustav Fischer Verlag, Stuttgart, pp.~203--213.

\harvarditem[Huster \& Enterline]{Huster \& Enterline}{1985}{hus85sur}
Huster, W. \& Enterline, J.  (1985), ``{SURVPAK}: an interactive survival
  analysis package'', {\em American Statistician} {\bf 39},~311.

\harvarditem[Iwane et al.]{Iwane, Palensky \& Plante}{1997}{iwa97use}
Iwane, M., Palensky, J. \& Plante, K.  (1997), ``A user's review of commercial
  sample size software for design of biomedical studies using survival data'',
  {\em Controlled Clinical Trials} {\bf 18},~65--83.

\harvarditem[Kalbfleisch \& Prentice]{Kalbfleisch \& Prentice}{1980}{kal80}
Kalbfleisch, J.~D. \& Prentice, R.~L.  (1980), {\em The Statistical Analysis of
  Failure Time Data}, Wiley, New York.

\harvarditem[Kalbfleisch \& Prentice]{Kalbfleisch \& Prentice}{1988}{kal88est}
Kalbfleisch, J.~D. \& Prentice, R.~L.  (1988), ``Estimation of reliability in
  field-performance studies, with discussion'', {\em Technometrics} {\bf
  30},~365--388.

\harvarditem[Kaplan \& Meier]{Kaplan \& Meier}{1958}{kap58}
Kaplan, E.~L. \& Meier, P.  (1958), ``Nonparametric estimation from incomplete
  observations'', {\em Journal of the American Statistical Association} {\bf
  53},~457--481.

\harvarditem[Lamport]{Lamport}{1994}{latex}
Lamport, L.  (1994), {\em \LaTeX: {A} Document Preparation System}, second edn,
  Addison--Wesley, Reading, MA.

\harvarditem[Lancaster]{Lancaster}{1990}{lan90eco}
Lancaster, T.  (1990), {\em The Econometric Analysis of Transition Data},
  Cambridge University Press, Cambridge.

\harvarditem[Lawless]{Lawless}{1982}{law82}
Lawless, J.~F.  (1982), {\em Statistical Models and Methods for Lifetime Data},
  Wiley, New York.

\harvarditem[Lawless \& Singhal]{Lawless \& Singhal}{1978}{law78}
Lawless, J.~F. \& Singhal, K.  (1978), ``Efficient screening of nonnormal
  regression models'', {\em Biometrics} {\bf 34},~318--327.

\harvarditem[{MathSoft}]{{MathSoft}}{1995}{Splus}
{MathSoft}  (1995), {\em S-Plus User's Manual, Version 3.3}, MathSoft, Inc.,
  Seattle WA.

\harvarditem[Schmidt \& Witte]{Schmidt \& Witte}{1989}{sch89pre}
Schmidt, P. \& Witte, A.~D.  (1989), ``Predicting criminal recidivism using
  `split population' survival time models'', {\em Journal of Econometrics} {\bf
  40},~141--159.

\harvarditem[Therneau et al.]{Therneau, Grambsch \& Fleming}{1990}{the90}
Therneau, T.~M., Grambsch, P.~M. \& Fleming, T.~R.  (1990), ``Martingale-based
  residuals for survival models'', {\em Biometrika} {\bf 77},~216--218.

\harvarditem[Wagner \& Meeker]{Wagner \& Meeker}{1985}{wag85sur}
Wagner, A.~E. \& Meeker, W.~Q.  (1985), A survey of statistical software for
  life data analysis, {\em in} ``Proceedings of the Statistical Computing
  Section, ASA'', pp.~441--446.

\harvarditem[Yamaguchi]{Yamaguchi}{1991}{yam91eve}
Yamaguchi, K.  (1991), {\em Event History Analysis}, Sage, Newbury Park.

\end{thebibliography}
